           8           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   1.981308377541300E-004  0.000000000000000
   0.988426042844175  0.000000000000000
   0.991642883287065  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
