           8           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -9.893837528337132E-004  0.000000000000000
   1.00203511632161  0.000000000000000
   0.998984556319849  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
