           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -9.962063337075730E-005  0.000000000000000
   0.988865192727945  0.000000000000000
   0.992002546411984  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
