           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.428117507796330E-003  0.000000000000000
   1.00200549216667  0.000000000000000
   0.999170689309346  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
