           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.492793321359911E-004  0.000000000000000
   0.989104553254198  0.000000000000000
   0.992225827882084  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
