           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.319384314299949E-003  0.000000000000000
   1.00206666502623  0.000000000000000
   0.999026653604964  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
