          55           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -2.859341389460941E-004  0.000000000000000
   0.988943835356410  0.000000000000000
   0.991886502670083  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
