          55           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.720201057644248E-003  0.000000000000000
   1.00208353889333  0.000000000000000
   0.999090222682597  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
