         180           8
   4.63464821309222        4.44509789037837        4.29581277551122     
   4.12381217355409        3.93189934616833        3.82328012675294     
   3.75081826254847        3.67311994830938     
  -10.1963466719102       -10.0342002321810       -9.82932754332126     
  -9.66309875158862       -9.53482016977719       -9.33238150145625     
  -9.08016628688075       -8.84977453217955     
 -9.315996670190585E-003  0.000000000000000E+000
   1.00915063823695       0.000000000000000E+000
   1.01357470415701       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
