         180           8
   6.66350412306967        6.38111066596373        6.18712772455985     
   5.96324670039272        5.81606341280646        5.69061539239525     
   5.51639707811138        5.43481323113906     
  -11.0720352643649       -10.9043223312787       -10.7747747296708     
  -10.7307775388905       -10.6644780486416       -10.4587200522717     
  -10.1690846614454       -10.0011000348918     
 -9.127922490590601E-003  0.000000000000000E+000
   1.00890217373916       0.000000000000000E+000
   1.01291957175033       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
