         180           3
   9.20675841301685        10.7900807981737        12.3934851849408     
  -10.1350272514917       -10.1113908302502       -9.07322904724904     
  1.086283392379314E-003  0.000000000000000E+000
  0.986450729470336       0.000000000000000E+000
  0.983733229303984       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
