         180           8
   7.06146199719914        6.86433256784503        6.67825252786405     
   6.51900504419486        6.37955215061714        6.25436928209397     
   6.14350563358682        6.00475036308701     
  -12.7587032026195       -12.7987070163201       -12.6593547519336     
  -12.4814685558316       -12.2562277203840       -12.0304898483666     
  -11.8001980281210       -11.5889670495984     
 -9.385400599711470E-003  0.000000000000000E+000
   1.00925019849582       0.000000000000000E+000
   1.01335398417514       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
