         180           8
   9.54301083181580        9.95029190110156        10.3953204375102     
   10.8620019818670        11.3269853221038        11.7722635664195     
   12.2246057352360        12.7186202443190     
  -11.9992282589524       -12.0036639198221       -11.8651129345047     
  -11.6413979585523       -11.3594030689580       -11.0344681418183     
  -10.6969413114601       -10.3112676408967     
  9.526435525127549E-004  0.000000000000000E+000
  0.987173153630209       0.000000000000000E+000
  0.984371786397655       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
