         180           8
   5.90594909955735        5.89856917066010        5.71598505552227     
   5.60076484185158        5.46098520153950        5.34455730143708     
   5.19162354980383        5.16607692764403     
  -11.6003728477898       -11.7458208936102       -11.7423602943787     
  -11.5924240837710       -11.3859687048881       -11.3112443856575     
  -11.2994020309668       -10.8999819100001     
 -9.450160973429851E-003  0.000000000000000E+000
   1.00943813773247       0.000000000000000E+000
   1.01308704418702       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
