         180           8
   6.60503877131552        6.50900897619417        6.42013215544603     
   6.30036724378061        6.16797627861092        6.08599857613008     
   5.99274449125547        6.00304551553064     
  -12.8442093787085       -12.8615184188534       -12.6977408589626     
  -12.4774703558466       -12.2888792532652       -12.0739345978974     
  -11.7857489909485       -11.6083900380434     
 -9.366141796121085E-003  0.000000000000000E+000
   1.00918385998513       0.000000000000000E+000
   1.01356235919865       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
