         180           8
   9.77268373276482        10.2746270953746        10.7402241812137     
   11.2270450990321        11.6881863379304        12.1154936645274     
   12.5420835585912        12.8043762949257     
  -12.2402170728233       -12.3401688209154       -12.1365449798614     
  -11.8832202863652       -11.6564241173279       -11.2827594587670     
  -10.8389801692294       -10.5547692511492     
  9.425042468306118E-004  0.000000000000000E+000
  0.987159856876889       0.000000000000000E+000
  0.984412421181737       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
