         180           8
   5.58034726859715        5.40549152782898        5.22959945556282     
   5.01917842149610        4.84611216433954        4.70402385326019     
   4.50185169199762        4.42118057404701     
  -11.9113826133534       -11.7224791231787       -11.5510395557285     
  -11.3376851786671       -11.1332876147884       -10.9028040593320     
  -10.6349534723533       -10.4383956944879     
 -9.351252559157633E-003  0.000000000000000E+000
   1.00880506810582       0.000000000000000E+000
   1.01272728464247       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
