         180           8
   9.36152834758270        9.74092614496480        10.1544990412971     
   10.6075094679167        11.0641088350215        11.5023110406530     
   11.8940405529942        12.3417652320600     
  -10.6699547066733       -10.3802457874814       -10.1942109370378     
  -10.0164307091109       -9.71182849203823       -9.34250228174475     
  -8.92840785341183       -8.53616660882875     
  7.915988196355066E-004  0.000000000000000E+000
  0.987130713116501       0.000000000000000E+000
  0.984584980314361       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
