         180           8
   6.01670897820015        5.75213904294999        5.56713158568227     
   5.42457187540888        5.28235295778378        5.12215114785335     
   5.02628034638324        4.91694051146646     
  -8.60183163700536       -8.41995315203009       -8.25288095208126     
  -8.05856508415601       -7.84417334735545       -7.62618008680162     
  -7.40627320069482       -7.20989495173187     
 -8.876392718429271E-003  0.000000000000000E+000
   1.00919895980498       0.000000000000000E+000
   1.01350833050536       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
