         180           3
   8.41576995612616        7.19779659987314        6.06994197154016     
  -6.80178351061403       -6.83129805255162       -6.81835325163199     
  8.164554914911298E-004  0.000000000000000E+000
  0.986718252634341       0.000000000000000E+000
  0.984041772288613       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
