         180           8
   6.08954401917061        5.83647656201085        5.66589829664731     
   5.49853269731189        5.36026769061363        5.21983784302701     
   5.09460726796281        5.12563818611348     
  -7.75988508154091       -7.54003501554524       -7.39418197873928     
  -7.21724416918160       -7.01816972162741       -6.86769437601425     
  -6.73552841243121       -6.49314893227634     
 -8.909418815072441E-003  0.000000000000000E+000
   1.00965088374749       0.000000000000000E+000
   1.01384348434561       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
