         180           8
   10.5099011883332        9.80853927074285        9.10996442230040     
   8.36704352082598        7.60463928215769        6.92317883785529     
   6.32821274217844        5.67303393539852     
  -6.43246307972396       -6.91054503487340       -6.89878120571369     
  -6.83116823689709       -6.89648876803961       -6.99072192142600     
  -7.07473871483126       -7.16188633866005     
 -9.080408096525064E-003  0.000000000000000E+000
   1.00971685918324       0.000000000000000E+000
   1.01375200581552       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
