         180           3
   9.99512868980278        11.5471614526322        13.3022871153501     
  -5.93606568038233       -5.14046781594748       -3.99500488840273     
  1.419082304070469E-003  0.000000000000000E+000
  0.987125190393116       0.000000000000000E+000
  0.984408905283670       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
