         180           8
   6.94901915390513        6.81352510474865        6.60436386505367     
   6.44890655943770        6.33677313686353        6.19552352514171     
   6.08986770699815        6.09409578100737     
  -5.21245481447778       -4.97690083078157       -4.78976528197342     
  -4.63732305530145       -4.50000943071965       -4.39254247890772     
  -4.24184369687657       -3.96807256622443     
 -8.557806682897370E-003  0.000000000000000E+000
   1.00989245456494       0.000000000000000E+000
   1.01358690384583       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
