         180           8
   6.68123218004052        6.50708671485665        6.31875025523233     
   6.16031454427811        6.00602670926419        5.84293970212808     
   5.76566262165961        5.67602494363980     
  -6.00505891858693       -5.81071449462211       -5.59945683502386     
  -5.39312524489707       -5.17738255765858       -5.00203205463349     
  -4.87014250380842       -4.63085116296431     
 -8.615860109705151E-003  0.000000000000000E+000
   1.00976431223268       0.000000000000000E+000
   1.01407644002135       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
