         180           3
   10.9897734035805        12.2104173117482        13.5569854080942     
  -10.6588135955441       -10.3636184887488       -9.42099708685746     
  2.473540052355901E-003  0.000000000000000E+000
  0.987072505068041       0.000000000000000E+000
  0.984529769860580       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
