         180           3
   10.3989421883188        11.7678290247112        13.4282999745089     
  -10.3096049556663       -9.45396969789391       -7.92584889371609     
  1.978511019200016E-003  0.000000000000000E+000
  0.986935086618799       0.000000000000000E+000
  0.984497023378461       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
