         180           3
   9.92083196121848        11.6073718791800        13.0272866250394     
  -8.17746095634298       -7.54615379636336       -6.20006730096779     
  1.700874347607877E-003  0.000000000000000E+000
  0.987156116670589       0.000000000000000E+000
  0.984475159490029       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
