         180           8
   12.3069439107126        11.5313534007326        10.8123897406753     
   10.0797206106041        9.40525658620382        8.71338643544486     
   8.04352415252942        7.37958978023691     
  -8.98159557966554       -8.99045286887267       -9.00582129727800     
  -9.05477872012080       -9.08586967611237       -9.14998866415266     
  -9.19646399110599       -9.23846528314512     
 -8.890037669256255E-003  0.000000000000000E+000
   1.00963862626236       0.000000000000000E+000
   1.01387456137320       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
