         180           8
   3.24820589784904        2.87314498859604        2.55387416581857     
   2.18577084852374        1.91505516294604        1.72070036454267     
   1.50792201118346        1.31814044644795     
  -6.00029835309826       -6.45665454813198       -6.74750004138149     
  -7.15745906982846       -7.36008500670384       -7.33425904278017     
  -7.16730006915904       -7.12291572405471     
 -8.813179151917155E-003  0.000000000000000E+000
   1.00950290791202       0.000000000000000E+000
   1.01357621239981       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
