         180           8
   3.10148500523395        2.74694773121723        2.47829324844745     
   2.17521024288161        1.84583461788998        1.46761546987395     
   1.16119492213919        1.13570903521164     
  -8.85323258244953       -8.98466301196344       -9.03228496668135     
  -9.19675656352008       -9.43969058296013       -9.56422007501152     
  -9.48260668036544       -9.41048756724076     
 -9.035447202408897E-003  0.000000000000000E+000
   1.00983632876010       0.000000000000000E+000
   1.01385161634887       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
