         180           3
   8.05407202916670        6.94001780438594        5.84110790237156     
  -7.04980221678394       -7.35715463219085       -6.21867446395944     
  7.902910475201831E-004  0.000000000000000E+000
  0.987057152973446       0.000000000000000E+000
  0.984257215376395       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
