         180           3
   8.99770761604461        7.17941863702487        6.14681674510747     
  -7.47063548090521       -7.07693841889652       -6.94224905639085     
  1.234171356206031E-003  0.000000000000000E+000
  0.987412342013198       0.000000000000000E+000
  0.984699419366442       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
