         180           8
   4.77642584053202        4.54802441343729        4.37616385606141     
   4.20460887162021        4.02755684688849        3.84263001369953     
   3.68175312561509        3.47883814131309     
  -7.74137908971224       -7.53836259215026       -7.38304658566445     
  -7.18550182082085       -6.97193266678965       -6.77998295408579     
  -6.71365825999186       -6.77985618666427     
 -8.746661208011534E-003  0.000000000000000E+000
   1.00945511867086       0.000000000000000E+000
   1.01403679540814       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
