         180           8
   1.57333982429089        1.15860519342142       0.751323713674473     
  0.465380237314228       2.835709175215532E-002 -0.647509543666727     
 -0.986456750650291       -1.03279793568857     
  -6.67294127915602       -6.50013279426393       -6.25405736591920     
  -6.13082749414856       -6.59645509876327       -7.26743325631954     
  -7.31761397951031       -7.19972470020908     
 -8.311424797338689E-003  0.000000000000000E+000
   1.00947821638548       0.000000000000000E+000
   1.01336103405869       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
