         180           8
   3.91615851637471        3.45693856999209        3.04868091424650     
   2.67595520091261        2.32714919125552        1.98910234706590     
   1.67626141982910        1.49313137725059     
  -6.57083494835176       -6.66383223941598       -6.66193698409552     
  -6.58913993649036       -6.52337225754682       -6.45740063601580     
  -6.20087329133018       -5.93682467747483     
 -8.140829906694435E-003  0.000000000000000E+000
   1.00939978009397       0.000000000000000E+000
   1.01367460888587       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
