         180           8
   14.8626717769267        14.0911694461372        13.0833263352059     
   12.1510536101613        11.6100177556645        11.2526403687909     
   10.6267119927188        9.74407391748523     
  -2.95204463673791       -3.03350383278996       -2.93718008805408     
  -2.86157720631416       -3.32361710210139       -4.01368717372155     
  -4.08226872427098       -3.66280189733057     
  1.478589271551918E-003  0.000000000000000E+000
  0.987254414697889       0.000000000000000E+000
  0.984819690787253       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
