         180           8
   1.95130987637561        1.21948956634273       0.603494411454371     
 -2.243998156719926E-002 -0.716572522034302       -1.39483477629109     
  -2.04497765691980       -2.64512743652956     
  -2.49731771750195       -2.95708975348473       -3.38372850770655     
  -3.35767908589908       -3.28408855685363       -3.35601458986041     
  -3.33478058646641       -3.31868054940430     
 -8.193745273480824E-003  0.000000000000000E+000
   1.01011298285254       0.000000000000000E+000
   1.01418061854593       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
