         180           8
   3.19500778278302        2.40398774214064        1.66717779214599     
  0.904889729086564       0.192531702802077      -0.526721755199684     
  -1.20649332592463       -1.89995881824692     
  -1.94301002755774       -2.05528281248623       -2.24934453928729     
  -2.31175142600689       -2.36977623628374       -2.53747465351344     
  -2.72838944498710       -2.95978847275110     
 -8.281901950038908E-003  0.000000000000000E+000
   1.01027426056335       0.000000000000000E+000
   1.01389335378468       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
