         180           8
  -1.83810451379591       -2.07796551984854       -2.28781967563052     
  -2.52201008587247       -2.76442883566778       -2.92562203866947     
  -3.09589094071194       -3.21332628535294     
  -3.69622177587964       -3.37414649831119       -3.05921519527519     
  -2.79001905599609       -2.61750929838048       -2.41114059389883     
  -2.19688407061233       -2.02593264443709     
 -8.646619366402930E-003  0.000000000000000E+000
   1.00985007353111       0.000000000000000E+000
   1.01438688852353       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
