         180           8
   1.17127275328600       0.943640548182220       0.677713388376706     
  0.441712451244623       0.243899833877684       3.171247028434543E-002
 -0.165694167181145      -0.458201219376256     
  -2.45898703716519       -2.18918783195566       -1.99914514002402     
  -1.79813934896653       -1.55150778554527       -1.29524234412072     
  -1.01555147966096      -0.766587445877821     
 -7.805709887119774E-003  0.000000000000000E+000
   1.00962560280211       0.000000000000000E+000
   1.01341116728871       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
