         180           8
   1.29322989171167        1.02270133262758       0.723337068523157     
  0.432155270261849       0.143976051601930      -0.112935736158472     
 -0.295347102358668      -0.435668190786786     
  -2.54131344653303       -2.24136170878473       -2.06044048465945     
  -1.80078248415271       -1.51770334016045       -1.34593340575954     
  -1.13014141218018      -0.743487513157934     
 -7.820183621562045E-003  0.000000000000000E+000
   1.00966153380438       0.000000000000000E+000
   1.01308571943186       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
