         180           8
   1.65432248891367        1.02196105262219       0.411408805697564     
 -0.508635402524659       -1.38470995641495       -1.89115361155094     
  -2.49981727525819       -2.95728021063309     
 -0.377645735933607      -0.403041326034823      -0.318147587754409     
  -1.06553694711730       -1.92264617027364       -1.44103729845492     
  -1.20288877500218      -0.892589838394718     
 -7.675677216462005E-003  0.000000000000000E+000
   1.00799197409622       0.000000000000000E+000
   1.01127765807811       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
