         180           8
   6.36296276990420        5.86153424213726        7.65551826561171     
   9.28691594989527        8.69443761919770        8.07637727615035     
   9.00405196622113        9.82687539140327     
  0.816228219914946       0.561067142551748       -1.67748163295298     
  -4.35295408970383       -5.01462702845513       -5.09018363095583     
  -5.27843110288308       -5.21388123382000     
  1.200889931560583E-003  0.000000000000000E+000
  0.985819377990150       0.000000000000000E+000
  0.984814269491847       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
