         180           8
   2.87850414710757        2.14520381636013        1.36804492185223     
  0.613300918394535      -0.179242450086772      -0.914616030583139     
  -1.59629359900791       -2.23482042454914     
 -0.937220437444351       -1.12167090454213       -1.20519546185566     
  -1.32436487063508       -1.49171051739522       -1.61282581801890     
  -1.67062279992780       -1.83511479866235     
 -7.835003299895869E-003  0.000000000000000E+000
   1.00940521078406       0.000000000000000E+000
   1.01285539847726       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
