         180           8
   3.25657411469621        2.41600973877685        1.72799336221683     
  0.925462422833724       0.143965192103756      -0.677534355097159     
  -1.56110378503620       -2.16563823502737     
  -1.82715795371582       -1.78305071927374       -1.77797615782000     
  -1.84278294560802       -1.85935707819932       -1.88427193809051     
  -2.05135835858712       -2.24938914026744     
 -8.055759937809610E-003  0.000000000000000E+000
   1.01000010051365       0.000000000000000E+000
   1.01374796198576       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
