         180           3
   14.1102638121274        11.0235300912471        8.57217964427215     
   1.05798112302030        1.48985663699024       0.896707484776142     
  5.265180082907544E-004  0.000000000000000E+000
  0.987343319062426       0.000000000000000E+000
  0.984663904409080       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
