         180           8
  0.489497438166988      -0.251668835125041      -0.897402147347954     
  -1.51118094191412       -2.15691325509032       -2.81693495158263     
  -3.37451445142226       -3.96080627366104     
  -1.35272401378537       -1.43838803957488       -1.64625787687457     
  -1.83229222441765       -1.94384058092905       -1.99965865713928     
  -1.91289504161356       -1.85272953545383     
 -7.958393053256369E-003  0.000000000000000E+000
   1.00962779772424       0.000000000000000E+000
   1.01389443828110       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
