         180           8
  -1.42240869547201       -2.08665199167668       -2.69625461249044     
  -3.27488053299718       -3.78460680911816       -4.29126004767545     
  -4.75892562563448       -5.19586428793468     
 -0.473619278662922      -0.634942621763105      -0.832894489530220     
  -1.05579488747491       -1.21199478352706       -1.39283591637913     
  -1.51526170735742       -1.55155560182846     
 -8.032509298906377E-003  0.000000000000000E+000
   1.00943905930346       0.000000000000000E+000
   1.01395368210743       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
