         180           8
  -2.86051455527988       -2.98127046092525       -3.15747721374972     
  -3.33507587463445       -3.49801850167510       -3.58507547971132     
  -3.62939171736770       -3.80882203488834     
  -3.15411203604646       -2.53875010591394       -2.18635889607818     
  -1.94334930151063       -1.79516711386731       -1.56668223211579     
  -1.29283959433259       -1.14922772773809     
 -7.887166150353585E-003  0.000000000000000E+000
   1.00977431366747       0.000000000000000E+000
   1.01416387316118       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
